mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 0π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 109 ± N1 = 6694 108 ± N2 = 6533 141 ± Nbkgd1 = 14824 142 ± Nbkgd2 = 15049 0.000021 ± md = 1.868882 0.023 ± p = 0.558 0.00019 ± sigmap1 = 0.00653 1.1 ± xi = -12.97

= 55.3 2 2χ = 65.4, 1 2χ

Fit Parameters