mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 90 ± N1 = 4557 89 ± N2 = 4452 159 ± Nbkgd1 = 21729 158 ± Nbkgd2 = 21585 0.000022 ± md = 1.868845 0.017 ± p = 0.515 0.00022 ± sigmap1 = 0.00363 0.81 ± xi = -10.366

= 50.1 2 2χ = 40.4, 1 2χ

Fit Parameters