mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 499 ± N1 = 247417 503 ± N2 = 251921 52 ± Nbkgd1 = 895 46 ± Nbkgd2 = 801 0.0000022 ± md = 1.8646088 0.11 ± p = 0.72 0.000016 ± sigmap1 = 0.004109 5.8 ± xi = -18.75

= 74.3 2 2χ = 68.6, 1 2χ

Fit Parameters