mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 383 ± N1 = 97422 382 ± N2 = 96999 401 ± Nbkgd1 = 111659 400 ± Nbkgd2 = 110767 0.0000049 ± md = 1.8694324 0.0078 ± p = 0.6200 0.000044 ± sigmap1 = 0.006325 0.40 ± xi = -22.858

= 109.4 2 2χ = 143.2, 1 2χ

Fit Parameters