mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 72 ± N1 = 3464 71 ± N2 = 3447 96 ± Nbkgd1 = 7459 95 ± Nbkgd2 = 7342 0.000024 ± md = 1.869150 0.030 ± p = 0.542 0.00025 ± sigmap1 = 0.00533 1.4 ± xi = -11.10

= 52.6 2 2χ = 64.4, 1 2χ

Fit Parameters