mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 152 ± N1 = 12764 152 ± N2 = 12675 198 ± Nbkgd1 = 28999 200 ± Nbkgd2 = 29735 0.000015 ± md = 1.869155 0.016 ± p = 0.507 0.00015 ± sigmap1 = 0.00718 0.77 ± xi = -10.971

= 69.7 2 2χ = 50.6, 1 2χ

Fit Parameters