mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 154 ± N1 = 13112 153 ± N2 = 12978 204 ± Nbkgd1 = 30818 203 ± Nbkgd2 = 30963 0.000016 ± md = 1.869178 0.015 ± p = 0.525 0.00014 ± sigmap1 = 0.00762 0.73 ± xi = -11.063

= 47.4 2 2χ = 63.4, 1 2χ

Fit Parameters