mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 192 ± N1 = 14256 192 ± N2 = 14152 227 ± Nbkgd1 = 36127 225 ± Nbkgd2 = 35347 0.000023 ± md = 1.869207 0.024 ± p = 1.097 0.00036 ± sigmap1 = 0.01242 0.92 ± xi = -29.264

= 2901.4 2 2χ = 2755.1, 1 2χ

Fit Parameters