mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 632 ± N1 = 362964 634 ± N2 = 365820 347 ± Nbkgd1 = 84191 346 ± Nbkgd2 = 83912 0.0000019 ± md = 1.8646059 0.0086 ± p = 0.5380 0.000016 ± sigmap1 = 0.004788 0.42 ± xi = -13.277

= 78.9 2 2χ = 62.8, 1 2χ

Fit Parameters