mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 462 ± N1 = 141320 465 ± N2 = 142486 502 ± Nbkgd1 = 179865 505 ± Nbkgd2 = 181227 0.0000040 ± md = 1.8694275 0.0060 ± p = 0.5477 0.000039 ± sigmap1 = 0.006560 0.30 ± xi = -16.269

= 125.7 2 2χ = 110.5, 1 2χ

Fit Parameters