mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 153 ± N1 = 20622 153 ± N2 = 20669 75 ± Nbkgd1 = 2746 74 ± Nbkgd2 = 2707 0.0000091 ± md = 1.8694421 0.054 ± p = 0.654 0.000082 ± sigmap1 = 0.006500 2.8 ± xi = -28.97

= 44.9 2 2χ = 37.8, 1 2χ

Fit Parameters