mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 116 ± N1 = 12591 115 ± N2 = 12449 49 ± Nbkgd1 = 1403 47 ± Nbkgd2 = 1358 0.0000098 ± md = 1.8693879 0.076 ± p = 0.636 0.000094 ± sigmap1 = 0.004455 3.8 ± xi = -24.85

= 34.1 2 2χ = 38.0, 1 2χ

Fit Parameters