mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 216 ± N1 = 39439 215 ± N2 = 39341 156 ± Nbkgd1 = 17412 157 ± Nbkgd2 = 17498 0.0000060 ± md = 1.8643236 0.020 ± p = 0.504 0.000054 ± sigmap1 = 0.004756 0.96 ± xi = -10.479

= 69.6 2 2χ = 74.2, 1 2χ

Fit Parameters