mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 499 ± N1 = 247474 503 ± N2 = 251958 46 ± Nbkgd1 = 843 42 ± Nbkgd2 = 759 0.0000022 ± md = 1.8646087 0.085 ± p = 0.626 0.000015 ± sigmap1 = 0.003992 4.3 ± xi = -12.68

= 92.1 2 2χ = 78.3, 1 2χ

Fit Parameters