mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 765 ± N1 = 487044 769 ± N2 = 492485 471 ± Nbkgd1 = 123468 474 ± Nbkgd2 = 124741 0.0000022 ± md = 1.8646641 0.0076 ± p = 0.6494 0.000016 ± sigmap1 = 0.006852 0.39 ± xi = -26.217

= 315.6 2 2χ = 345.9, 1 2χ

Fit Parameters