mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 634 ± N1 = 364539 637 ± N2 = 367425 347 ± Nbkgd1 = 82590 347 ± Nbkgd2 = 82312 0.0000019 ± md = 1.8646054 0.0089 ± p = 0.4973 0.000017 ± sigmap1 = 0.004554 0.44 ± xi = -10.947

= 104.3 2 2χ = 90.8, 1 2χ

Fit Parameters