mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 621 ± N1 = 364154 623 ± N2 = 367283 228 ± Nbkgd1 = 30921 228 ± Nbkgd2 = 30923 0.0000018 ± md = 1.8694068 0.015 ± p = 0.653 0.000017 ± sigmap1 = 0.004302 0.76 ± xi = -26.340

= 74.3 2 2χ = 71.7, 1 2χ

Fit Parameters