mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 476 ± N1 = 144122 478 ± N2 = 145330 509 ± Nbkgd1 = 177064 512 ± Nbkgd2 = 178384 0.0000041 ± md = 1.8694258 0.0061 ± p = 0.5255 0.000043 ± sigmap1 = 0.006274 0.31 ± xi = -14.629

= 118.1 2 2χ = 125.3, 1 2χ

Fit Parameters