mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 386 ± N1 = 98082 386 ± N2 = 97644 403 ± Nbkgd1 = 110999 402 ± Nbkgd2 = 110123 0.0000049 ± md = 1.8694317 0.0079 ± p = 0.6111 0.000043 ± sigmap1 = 0.006092 0.40 ± xi = -22.228

= 101.4 2 2χ = 133.2, 1 2χ

Fit Parameters