mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 174 ± N1 = 12939 175 ± N2 = 13042 260 ± Nbkgd1 = 50154 261 ± Nbkgd2 = 50649 0.000017 ± md = 1.869175 0.012 ± p = 0.505 0.00018 ± sigmap1 = 0.00708 0.60 ± xi = -9.852

= 67.9 2 2χ = 56.9, 1 2χ

Fit Parameters