mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 180 ± N1 = 13335 179 ± N2 = 13385 275 ± Nbkgd1 = 56819 274 ± Nbkgd2 = 56584 0.000018 ± md = 1.869182 0.011 ± p = 0.514 0.00017 ± sigmap1 = 0.00755 0.54 ± xi = -9.585

= 55.3 2 2χ = 50.0, 1 2χ

Fit Parameters