mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 143 ± N1 = 8246 142 ± N2 = 8158 291 ± Nbkgd1 = 72335 289 ± Nbkgd2 = 71545 0.000020 ± md = 1.869123 0.0094 ± p = 0.5099 0.00023 ± sigmap1 = 0.00491 0.44 ± xi = -9.616

= 52.0 2 2χ = 35.5, 1 2χ

Fit Parameters