mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 290 ± N1 = 70248 292 ± N2 = 71412 165 ± Nbkgd1 = 13218 164 ± Nbkgd2 = 13095 0.0000057 ± md = 1.8646612 0.027 ± p = 0.996 0.000042 ± sigmap1 = 0.007033 1.3 ± xi = -49.99

= 103.2 2 2χ = 165.0, 1 2χ

Fit Parameters