mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 119 ± N1 = 12815 118 ± N2 = 12674 59 ± Nbkgd1 = 2092 58 ± Nbkgd2 = 2084 0.000010 ± md = 1.869393 0.062 ± p = 0.685 0.000099 ± sigmap1 = 0.004493 3.1 ± xi = -26.32

= 35.4 2 2χ = 33.2, 1 2χ

Fit Parameters