mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 164 ± N1 = 25551 165 ± N2 = 26049 58 ± Nbkgd1 = 2026 57 ± Nbkgd2 = 1958 0.0000072 ± md = 1.8643297 0.0044 ± p = 0.2965 0.000052 ± sigmap1 = 0.004385 1.2 ± xi = -12.00

= 62.1 2 2χ = 98.3, 1 2χ

Fit Parameters