mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 208 ± N1 = 40111 209 ± N2 = 40595 93 ± Nbkgd1 = 5630 94 ± Nbkgd2 = 5670 0.0000056 ± md = 1.8691371 0.034 ± p = 0.650 0.000054 ± sigmap1 = 0.004589 1.6 ± xi = -18.88

= 66.9 2 2χ = 51.2, 1 2χ

Fit Parameters