mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 156 ± N1 = 13281 155 ± N2 = 13141 204 ± Nbkgd1 = 30650 204 ± Nbkgd2 = 30800 0.000016 ± md = 1.869171 0.017 ± p = 0.521 0.000072 ± sigmap1 = 0.003643 0.82 ± xi = -10.488

= 53.4 2 2χ = 59.9, 1 2χ

Fit Parameters