mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 642 ± N1 = 5201 653 ± N2 = 5125 640 ± Nbkgd1 = 5724 651 ± Nbkgd2 = 5664 0.00054 ± md = 1.87011 0.089 ± p = 0.607 0.027 ± sigmap1 = 0.040 0.022 ± xi = -0.1003

= 2480.1 2 2χ = 2283.2, 1 2χ

Fit Parameters