mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 208 ± N1 = 40020 209 ± N2 = 40501 94 ± Nbkgd1 = 5720 94 ± Nbkgd2 = 5763 0.0000054 ± md = 1.8691431 0.023 ± p = 0.591 0.000053 ± sigmap1 = 0.004597 0.99 ± xi = -17.908

= 66.3 2 2χ = 51.3, 1 2χ

Fit Parameters