mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 153 ± N1 = 12914 153 ± N2 = 12825 198 ± Nbkgd1 = 28848 200 ± Nbkgd2 = 29584 0.000015 ± md = 1.869154 0.014 ± p = 0.502 0.00015 ± sigmap1 = 0.00704 0.67 ± xi = -10.498

= 70.2 2 2χ = 49.3, 1 2χ

Fit Parameters