mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π _SK

→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π _SK

→^-D

1

→^-D^{Fit Parameters} 80 ± N1 = 5723 80 ± N2 = 5806 51 ± Nbkgd1 = 1910 50 ± Nbkgd2 = 1822 0.000015 ± md = 1.869146 0.044 ± p = 0.616 0.00014 ± sigmap1 = 0.00466 2.0 ± xi = -14.02

= 42.1 2 2χ = 40.8, 1 2χ

Fit Parameters