mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters}

1313 ± N1 = 16473 1293 ± N2 = 16612 1318 ± Nbkgd1 = 33004 1298 ± Nbkgd2 = 32376 0.0000044 ± md = 1.8708880 1.0 ± p = 1.5 0.0000084 ± sigmap1 = 0.0400000 1.5 ± xi = -30.36

= 4586.8 2 2χ = 4604.3, 1 2χ

Fit Parameters