mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 154 ± N1 = 13010 154 ± N2 = 12920 199 ± Nbkgd1 = 28752 201 ± Nbkgd2 = 29490 0.000016 ± md = 1.869138 0.015 ± p = 0.503 0.00016 ± sigmap1 = 0.00698 0.75 ± xi = -10.275

= 71.4 2 2χ = 48.3, 1 2χ

Fit Parameters