mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 214 ± N1 = 39355 213 ± N2 = 39256 154 ± Nbkgd1 = 17493 154 ± Nbkgd2 = 17583 0.0000061 ± md = 1.8643242 0.000054 ± sigmap1 = 0.004861 0.38 ± xi = -10.482

= 64.8 2 2χ = 66.3, 1 2χ

Fit Parameters