mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 151 ± N1 = 12914 151 ± N2 = 12824 197 ± Nbkgd1 = 28849 199 ± Nbkgd2 = 29586 0.000016 ± md = 1.869154 0.00015 ± sigmap1 = 0.00705 0.31 ± xi = -10.419

= 70.0 2 2χ = 50.1, 1 2χ

Fit Parameters