mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 219 ± N1 = 46653 219 ± N2 = 46763 56 ± Nbkgd1 = 1814 57 ± Nbkgd2 = 1856 0.0000053 ± md = 1.8645991 0.000042 ± sigmap1 = 0.004699 1.3 ± xi = -16.67

= 45.4 2 2χ = 42.5, 1 2χ

Fit Parameters