mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 215 ± N1 = 44874 216 ± N2 = 45021 55 ± Nbkgd1 = 1604 57 ± Nbkgd2 = 1676 0.0000054 ± md = 1.8645966 0.065 ± p = 0.462 0.000044 ± sigmap1 = 0.004636 3.5 ± xi = -14.59

= 45.5 2 2χ = 35.5, 1 2χ

Fit Parameters