mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 151 ± N1 = 20074 151 ± N2 = 20156 73 ± Nbkgd1 = 2465 72 ± Nbkgd2 = 2449 0.0000095 ± md = 1.8694381 0.056 ± p = 0.593 0.000085 ± sigmap1 = 0.006184 3.0 ± xi = -24.86

= 54.7 2 2χ = 42.4, 1 2χ

Fit Parameters