mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 124 ± N1 = 13818 124 ± N2 = 13789 52 ± Nbkgd1 = 1225 54 ± Nbkgd2 = 1309 0.000012 ± md = 1.869413 0.078 ± p = 0.576 0.000046 ± sigmap1 = 0.003316 4.3 ± xi = -26.99

= 35.2 2 2χ = 44.2, 1 2χ

Fit Parameters