mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 257 ± N1 = 49874 258 ± N2 = 50120 204 ± Nbkgd1 = 25417 206 ± Nbkgd2 = 25585 0.0000072 ± md = 1.8643464 0.018 ± p = 0.609 0.000056 ± sigmap1 = 0.007549 0.89 ± xi = -19.326

= 99.9 2 2χ = 69.0, 1 2χ

Fit Parameters