mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 215 ± N1 = 39335 215 ± N2 = 39237 157 ± Nbkgd1 = 17518 157 ± Nbkgd2 = 17606 0.0000063 ± md = 1.8643241 0.020 ± p = 0.517 0.000056 ± sigmap1 = 0.004853 0.98 ± xi = -11.226

= 65.0 2 2χ = 66.2, 1 2χ

Fit Parameters