mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 763 ± N1 = 485360 767 ± N2 = 490786 471 ± Nbkgd1 = 125142 474 ± Nbkgd2 = 126432 0.0000022 ± md = 1.8646645 0.0077 ± p = 0.6732 0.000016 ± sigmap1 = 0.006933 0.39 ± xi = -27.538

= 332.6 2 2χ = 362.9, 1 2χ

Fit Parameters