mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+ K^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 250 ± N1 = 51633 251 ± N2 = 51955 217 ± Nbkgd1 = 36220 216 ± Nbkgd2 = 35931 0.0000051 ± md = 1.8694063 0.014 ± p = 0.492 0.000055 ± sigmap1 = 0.004720 0.69 ± xi = -10.361

= 61.0 2 2χ = 55.0, 1 2χ

Fit Parameters