mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 469 ± N1 = 142708 471 ± N2 = 143892 505 ± Nbkgd1 = 178476 508 ± Nbkgd2 = 179820 0.0000041 ± md = 1.8694266 0.0060 ± p = 0.5364 0.000042 ± sigmap1 = 0.006394 0.31 ± xi = -15.437

= 113.8 2 2χ = 107.8, 1 2χ

Fit Parameters