mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 168 ± N1 = 26003 170 ± N2 = 26564 78 ± Nbkgd1 = 3706 77 ± Nbkgd2 = 3652 0.0000075 ± md = 1.8643259 0.040 ± p = 0.314 0.000057 ± sigmap1 = 0.004602 2.1 ± xi = -7.55

= 58.9 2 2χ = 94.6, 1 2χ

Fit Parameters