mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 156 ± N1 = 20232 156 ± N2 = 20363 91 ± Nbkgd1 = 4144 90 ± Nbkgd2 = 4077 0.0000097 ± md = 1.8694411 0.043 ± p = 0.648 0.000089 ± sigmap1 = 0.006319 2.3 ± xi = -30.10

= 57.0 2 2χ = 38.6, 1 2χ

Fit Parameters