mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 223 ± N1 = 47620 224 ± N2 = 47736 70 ± Nbkgd1 = 2776 72 ± Nbkgd2 = 2892 0.0000053 ± md = 1.8646021 0.048 ± p = 0.581 0.000042 ± sigmap1 = 0.004966 2.5 ± xi = -21.58

= 64.2 2 2χ = 52.1, 1 2χ

Fit Parameters