mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D^{Fit Parameters} 194 ± N1 = 37177 194 ± N2 = 36812 28 ± Nbkgd1 = 252 31 ± Nbkgd2 = 296 0.0000057 ± md = 1.8694142 0.000050 ± sigmap1 = 0.004500 4.5 ± xi = -35.65

= 92.4 2 2χ = 77.4, 1 2χ

Fit Parameters