mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 129 ± N1 = 14248 129 ± N2 = 14312 68 ± Nbkgd1 = 2229 69 ± Nbkgd2 = 2241 0.000012 ± md = 1.869424 0.055 ± p = 0.674 0.000048 ± sigmap1 = 0.003454 3.0 ± xi = -34.82

= 48.5 2 2χ = 42.3, 1 2χ

Fit Parameters