mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 113 ± N1 = 11980 113 ± N2 = 11999 45 ± Nbkgd1 = 1209 44 ± Nbkgd2 = 1168 0.0000099 ± md = 1.8694090 0.072 ± p = 0.433 0.000090 ± sigmap1 = 0.004171 3.8 ± xi = -13.89

= 43.1 2 2χ = 40.5, 1 2χ

Fit Parameters